From b7e39b59fd0fc7b5610ebff29035bf622079e0d8 Mon Sep 17 00:00:00 2001
From: ivarlovlie <git@ivarlovlie.no>
Date: Wed, 5 Oct 2022 20:45:21 +0800
Subject: refactor: Change file structure

---
 old-apps/web-shared/src/components/tile.svelte | 4 ----
 1 file changed, 4 deletions(-)
 delete mode 100644 old-apps/web-shared/src/components/tile.svelte

(limited to 'old-apps/web-shared/src/components/tile.svelte')

diff --git a/old-apps/web-shared/src/components/tile.svelte b/old-apps/web-shared/src/components/tile.svelte
deleted file mode 100644
index b8e9cdf..0000000
--- a/old-apps/web-shared/src/components/tile.svelte
+++ /dev/null
@@ -1,4 +0,0 @@
-<section class="bg-light radius-sm padding-sm inner-glow shadow-xs {$$restProps.class??''}"
-         style="height: fit-content;">
-    <slot/>
-</section>
-- 
cgit v1.3

