From b7e39b59fd0fc7b5610ebff29035bf622079e0d8 Mon Sep 17 00:00:00 2001
From: ivarlovlie <git@ivarlovlie.no>
Date: Wed, 5 Oct 2022 20:45:21 +0800
Subject: refactor: Change file structure

---
 .../web-shared/src/components/screens/GeneralErrorScreen.svelte    | 7 -------
 1 file changed, 7 deletions(-)
 delete mode 100644 old-apps/web-shared/src/components/screens/GeneralErrorScreen.svelte

(limited to 'old-apps/web-shared/src/components/screens/GeneralErrorScreen.svelte')

diff --git a/old-apps/web-shared/src/components/screens/GeneralErrorScreen.svelte b/old-apps/web-shared/src/components/screens/GeneralErrorScreen.svelte
deleted file mode 100644
index dd4b5bd..0000000
--- a/old-apps/web-shared/src/components/screens/GeneralErrorScreen.svelte
+++ /dev/null
@@ -1,7 +0,0 @@
-<script>
-	export let message;
-	export let status;
-</script>
-
-<h1>{status}</h1>
-<p>{message}</p>
-- 
cgit v1.3

