From b7e39b59fd0fc7b5610ebff29035bf622079e0d8 Mon Sep 17 00:00:00 2001
From: ivarlovlie <git@ivarlovlie.no>
Date: Wed, 5 Oct 2022 20:45:21 +0800
Subject: refactor: Change file structure

---
 .../src/components/locale-switcher-icon.svelte           | 16 ----------------
 1 file changed, 16 deletions(-)
 delete mode 100644 old-apps/web-shared/src/components/locale-switcher-icon.svelte

(limited to 'old-apps/web-shared/src/components/locale-switcher-icon.svelte')

diff --git a/old-apps/web-shared/src/components/locale-switcher-icon.svelte b/old-apps/web-shared/src/components/locale-switcher-icon.svelte
deleted file mode 100644
index d2776a1..0000000
--- a/old-apps/web-shared/src/components/locale-switcher-icon.svelte
+++ /dev/null
@@ -1,16 +0,0 @@
-<script>
-	import {GlobeIcon} from "svelte-feather-icons";
-
-	export let show = false;
-	export let selection = "preffered";
-</script>
-<div data-locale-switcher-element
-     class="ld-switch flex">
-    <button class="reset ld-switch-btn"
-            on:click={() => (show = !show)}>
-        <div class="ld-switch-btn__icon-wrapper ld-switch-btn__icon-wrapper--in"
-             aria-hidden="true">
-            <GlobeIcon/>
-        </div>
-    </button>
-</div>
-- 
cgit v1.3

