From b7e39b59fd0fc7b5610ebff29035bf622079e0d8 Mon Sep 17 00:00:00 2001
From: ivarlovlie <git@ivarlovlie.no>
Date: Wed, 5 Oct 2022 20:45:21 +0800
Subject: refactor: Change file structure

---
 code/app/src/routes/book/toggles/+page.svelte | 27 +++++++++++++++++++++++++++
 1 file changed, 27 insertions(+)
 create mode 100644 code/app/src/routes/book/toggles/+page.svelte

(limited to 'code/app/src/routes/book/toggles/+page.svelte')

diff --git a/code/app/src/routes/book/toggles/+page.svelte b/code/app/src/routes/book/toggles/+page.svelte
new file mode 100644
index 0000000..94228b4
--- /dev/null
+++ b/code/app/src/routes/book/toggles/+page.svelte
@@ -0,0 +1,27 @@
+<script>
+    import Switch from "$lib/components/switch.svelte";
+</script>
+
+<section>
+    <h2>Default</h2>
+    <Switch />
+</section>
+<section>
+    <h2>Short</h2>
+    <Switch type="short" />
+</section>
+<section>
+    <h2>Icon</h2>
+    <Switch type="icon" />
+</section>
+<section>
+    <h2>Label / Description</h2>
+    <div class="max-w-md">
+        <Switch label="Label" description="Some text" />
+    </div>
+</section>
+
+<section>
+    <h2>Label / Description (right aligned)</h2>
+        <Switch label="Label" description="Some text" rightAlignedLabelDescription />
+</section>
\ No newline at end of file
-- 
cgit v1.3

