From 9db0f70f75886ab1f97e231a3f9c16fcbbbe04bd Mon Sep 17 00:00:00 2001
From: ivarlovlie <git@ivarlovlie.no>
Date: Wed, 1 Jun 2022 22:20:31 +0200
Subject: refactor: Move projects-web to projects

---
 apps/projects/src/app/pages/not-found.svelte | 24 ++++++++++++++++++++++++
 1 file changed, 24 insertions(+)
 create mode 100644 apps/projects/src/app/pages/not-found.svelte

(limited to 'apps/projects/src/app/pages/not-found.svelte')

diff --git a/apps/projects/src/app/pages/not-found.svelte b/apps/projects/src/app/pages/not-found.svelte
new file mode 100644
index 0000000..46d0d1d
--- /dev/null
+++ b/apps/projects/src/app/pages/not-found.svelte
@@ -0,0 +1,24 @@
+<script>
+	import {link} from "svelte-spa-router";
+</script>
+
+<style>
+    header {
+        font-size: 12rem;
+    }
+
+    main {
+        position: absolute;
+        left: 50%;
+        top: 50%;
+        transform: translate(-50%, -50%);
+        text-align: center;
+    }
+</style>
+
+<main>
+    <header>404</header>
+    <p>Page not found!</p>
+    <a use:link
+       href="/">Go to front</a>
+</main>
-- 
cgit v1.3

