From 3211ef25f7bc321832c9962eb73c7201d221e2a6 Mon Sep 17 00:00:00 2001
From: ivarlovlie <git@ivarlovlie.no>
Date: Sun, 5 Jun 2022 18:45:16 +0200
Subject: refactor: Update style on portal forms

---
 apps/portal/src/app/pages/not-found.svelte | 23 -----------------------
 1 file changed, 23 deletions(-)
 delete mode 100644 apps/portal/src/app/pages/not-found.svelte

(limited to 'apps/portal/src/app/pages/not-found.svelte')

diff --git a/apps/portal/src/app/pages/not-found.svelte b/apps/portal/src/app/pages/not-found.svelte
deleted file mode 100644
index 34568ba..0000000
--- a/apps/portal/src/app/pages/not-found.svelte
+++ /dev/null
@@ -1,23 +0,0 @@
-<script>
-	import {link} from "svelte-spa-router";
-</script>
-<style>
-    header {
-        font-size: 12rem;
-    }
-
-    main {
-        position: absolute;
-        left: 50%;
-        top: 50%;
-        transform: translate(-50%, -50%);
-        text-align: center;
-    }
-</style>
-
-<main>
-    <header>404</header>
-    <p>Page not found!</p>
-    <a use:link
-       href="/">Go to front</a>
-</main>
-- 
cgit v1.3

