From b7e39b59fd0fc7b5610ebff29035bf622079e0d8 Mon Sep 17 00:00:00 2001
From: ivarlovlie <git@ivarlovlie.no>
Date: Wed, 5 Oct 2022 20:45:21 +0800
Subject: refactor: Change file structure

---
 apps/kit/src/routes/book/toggles/+page.svelte | 27 ---------------------------
 1 file changed, 27 deletions(-)
 delete mode 100644 apps/kit/src/routes/book/toggles/+page.svelte

(limited to 'apps/kit/src/routes/book/toggles/+page.svelte')

diff --git a/apps/kit/src/routes/book/toggles/+page.svelte b/apps/kit/src/routes/book/toggles/+page.svelte
deleted file mode 100644
index 94228b4..0000000
--- a/apps/kit/src/routes/book/toggles/+page.svelte
+++ /dev/null
@@ -1,27 +0,0 @@
-<script>
-    import Switch from "$lib/components/switch.svelte";
-</script>
-
-<section>
-    <h2>Default</h2>
-    <Switch />
-</section>
-<section>
-    <h2>Short</h2>
-    <Switch type="short" />
-</section>
-<section>
-    <h2>Icon</h2>
-    <Switch type="icon" />
-</section>
-<section>
-    <h2>Label / Description</h2>
-    <div class="max-w-md">
-        <Switch label="Label" description="Some text" />
-    </div>
-</section>
-
-<section>
-    <h2>Label / Description (right aligned)</h2>
-        <Switch label="Label" description="Some text" rightAlignedLabelDescription />
-</section>
\ No newline at end of file
-- 
cgit v1.3

