From 2b58ff029107b23617d8c4b246de77876b3bf053 Mon Sep 17 00:00:00 2001
From: ivarlovlie <git@ivarlovlie.no>
Date: Wed, 28 Sep 2022 00:21:37 +0800
Subject: feat: Move frontend into layout group (main)

This enables /book to load without the usual layout (app layout)
---
 apps/kit/src/lib/components/alert.svelte | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'apps/kit/src/lib/components/alert.svelte')

diff --git a/apps/kit/src/lib/components/alert.svelte b/apps/kit/src/lib/components/alert.svelte
index 6cc0e63..5bcb3ae 100644
--- a/apps/kit/src/lib/components/alert.svelte
+++ b/apps/kit/src/lib/components/alert.svelte
@@ -17,12 +17,12 @@
     let iconComponent: any;
     let colorClassPart = "";
 
-    // if no unique id is supplied, cooldown will not work between page loads.
-    // Therefore we are disabling it with noCooldownSetting in the fallback id.
     /**
      * An optional id for this alert, a default is set if not specified.
      * This value is necessary for closeable cooldown to work.
      */
+    // if no unique id is supplied, cooldown will not work between page loads.
+    // Therefore we are disabling it with noCooldownSetting in the fallback id.
     export let id = "alert--" + noCooldownSetting + "--" + random_string(4);
     /**
      * The title to communicate, value is optional
@@ -42,7 +42,7 @@
     export let closeable = false;
     /**
      * The amount of seconds that should go by before this alert is shown again, only works when a unique id is set.
-     * Set to ~ if it should be only shown once per client (State stored in localestorage).
+     * Set to ~ if it should only be shown once per client (State stored in localestorage).
      **/
     export let closeableCooldown = "-1";
     /**
-- 
cgit v1.3

